Directions To The Royal Sonesta Hotel Boston

5 Cambridge Parkway

From the Chandra OCC Site: On Broadway, proceed to traffic signal, turn left onto Binney Street, and proceed to end. At traffic signal, turn left onto Edwin Land Boulevard. The hotel entrance/garage are located on the right at the next traffic signal, across from the CambridgeSide Galleria.

From The Airport: Take the main airport roadway (one-way) out of the airport and follow signs for Sumner Tunnel, Boston/Route 93 North. Go through the tunnel, staying in left lane onto Route 93 North. (Follow directions FROM THE SOUTH below.) The hotel is approximately three and a half miles from the airport.

From The West via the Massachusetts Turnpike (I-90 Toll Road): While eastbound, take left to Exit 18 following signs to Allston/Cambridge. Stay in the right lane, following signs to Cambridge/Somerville. Cross over the Charles River on River Street Bridge (Cambridge Street), and take a right at traffic light onto Memorial Drive (Route #3). Follow Memorial Drive East (Route #3 South) using the cars only option twice, then stay in the far right lane along the river, as Memorial Drive becomes Edwin Land Boulevard. The hotel is on the right at the second traffic signal, directly across from the CambridgeSide Galleria.

From The West Via Storrow Drive: Proceed east on Storrow Drive to Leveritt Circle.

Remain in the left or middle lane to proceed left onto Route 28 North/Msgr O’Brien Highway. Pass the Museum of Science on your left. Proceed to second traffic light and take a left onto Edwin Land Boulevard. The hotel is on the left at the next traffic signal, across from the CambridgeSide Galleria.

From The South (Route 93N): Take 93 North to the Liberty Tunnel, moving to the right lane after Exit 23, and take Exit 26 (Storrow Drive). Stay to the right moving onto Storrow Drive. Take immediate left exit (Government Center/Kendall Square), and turn right at top of ramp onto Longfellow Bridge. Proceed to traffic signal, and turn right onto Third Street. Proceed to traffic signal, turn right onto Binney Street, and proceed to end. At traffic signal, turn left onto Edwin Land Boulevard. The hotel entrance/garage are located on the right at the next traffic signal, across from the CambridgeSide Galleria.

From The North (Route 93S): Take 93 South to Exit 26A (not accessible from carpool lane), Storrow Drive/Cambridge/Route 28N/Route 3N. Stay to the right, moving to the middle lane, following signs for Route 28 North/Cambridge/North Station. At the traffic signal, take a left onto Nashua Street. Take the first right onto Route 28 North/Msgr O’Brien Highway. Pass the Museum of Science on your left. Proceed to second traffic light and take a left onto Edwin Land Boulevard. The hotel is on the left at the next traffic signal, across from the CambridgeSide Galleria.

October 13, 2005 OVER –>

From The North (Route 1S - Toll Road): Take Route 1 South over the Tobin Bridge.

Once through the tollbooth, stay in the far left lane, following signs for Boston/93 North/Route 1 South. After a quarter-mile, take the exit marked Route 28N/Cambridge/North Station. Stay to the right at the fork, moving to the middle lane, following signs for Route 28 North/Cambridge/North Station. At the traffic signal, turn left onto Nashua Street. Take the first right onto Route 28 North/Msgr O’Brien Highway. Pass the Museum of Science on your left. Proceed to second traffic light, and turn left onto Edwin Land Boulevard. The hotel is on the left at the next traffic signal, across from the CambridgeSide Galleria.

MBTA Directions To The Royal Sonesta Hotel Boston

Green Line: Take the Green Line MBTA trolley to Lechmere Station. Exit train and follow signs to Cambridge Street. Cross to First Street, walk along the CambridgeSide Galleria to Charles Street/Cambridgeside Place, and turn left. The hotel will be at the end of the block.

Red Line: Take the Red Line to Kendall Square Station. Exit station and cross the street to the Harvard Coop. The ‘Wave’ Shuttle Service picks up at this location on a posted schedule (10AM-7PM). The shuttle bus will drop you off at the CambridgeSide Galleria, across the street from the hotel. Walk across Edwin Land Boulevard to the hotel.