Figure 3: As in the plots at top left, but for degapped data in tiled detector coordinates. The data are shown for corrections made with different methods, and offset from the exact solution (thick light solid line) for clarity. The CALDB solution (red; shifted downwards) still shows a residual 1-pixel gap, which has been eliminated in the empirical polynomial solution (5^{th}-order polynomial fit to the exact solution – blue; shifted upwards).